----------------------------------------------------------------后端服务启动前执行-----------------------------------------------------------------------------------------
-- 新增通知相关表
CREATE TABLE `ec_t_reports_compute` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT,
  `creation_time` datetime NOT NULL,
  `update_time` datetime NOT NULL,
  `end_time` datetime DEFAULT NULL,
  `error_desc` varchar(255) DEFAULT NULL,
  `project_id` bigint(20) NOT NULL,
  `root_org_id` bigint(20) NOT NULL,
  `start_time` datetime DEFAULT NULL,
  `status` varchar(255) NOT NULL,
  PRIMARY KEY (`id`),
  KEY `IDX_T_REPORTS_COMPUTE_01` (`project_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

----------------------------------------------------------------后端服务启动后执行------------------------------------------------------------------------------------------


